\thispagestyle{empty}
\vspace*{0.8\textheight}
\noindent
I confirm that this \MakeLowercase{\getDoctype{}} is my own work and I have documented all sources and material used.

\vspace{15mm}
\noindent
\getSubmissionLocation{}, \getSubmissionDate{} \hspace{5cm} \getAuthor{}

\cleardoublepage{}
